2.25 2.3 2.35

)^2c

) (GeV/ π (pK M

12

13

14

15

16 310 ×

2c Entries per 4.0 MeV/

2c 0.001 GeV/ ± = 2.290 μ , fixed to MC 2c = 0.006 GeV/ σ 289 ± ) = 3140 σ3±S(

+ c.c. +π^− pK → ^+_cΛ

= 5.02 TeV s ALICE pp, c < 4 GeV/ Tp 3 <

ALI-PUB-499686

ALI-PUB-499686